\section{\module{posix} ---
         The most common \POSIX{} system calls.}
\declaremodule{builtin}{posix}

\modulesynopsis{The most common \POSIX{} system calls (normally used
via module \module{os}).}


This module provides access to operating system functionality that is
standardized by the \C{} Standard and the \POSIX{} standard (a thinly
disguised \UNIX{} interface).

\strong{Do not import this module directly.}  Instead, import the
module \module{os}, which provides a \emph{portable} version of this
interface.  On \UNIX{}, the \module{os} module provides a superset of
the \module{posix} interface.  On non-\UNIX{} operating systems the
\module{posix} module is not available, but a subset is always
available through the \module{os} interface.  Once \module{os} is
imported, there is \emph{no} performance penalty in using it instead
of \module{posix}.  In addition, \module{os}\refstmodindex{os}
provides some additional functionality, such as automatically calling
\function{putenv()} when an entry in \code{os.environ} is changed.

The descriptions below are very terse; refer to the corresponding
\UNIX{} manual (or \POSIX{} documentation) entry for more information.
Arguments called \var{path} refer to a pathname given as a string.

Errors are reported as exceptions; the usual exceptions are given for
type errors, while errors reported by the system calls raise
\exception{error} (a synonym for the standard exception
\exception{OSError}), described below.

\subsection{Large File Support \label{posix-large-files}}
\index{large files}
\index{file!large files}

\sectionauthor{Steve Clift}{clift@mail.anacapa.net}

Several operating systems (including AIX, HPUX, Irix and Solaris)
provide support for files that are larger than 2 Gb from a \C{}
programming model where \ctype{int} and \ctype{long} are 32-bit
values. This is typically accomplished by defining the relevant size
and offset types as 64-bit values. Such files are sometimes referred
to as \dfn{large files}.

Large file support is enabled in Python when the size of an
\ctype{off_t} is larger than a \ctype{long} and the \ctype{long long}
type is available and is at least as large as an \ctype{off_t}. Python
longs are then used to represent file sizes, offsets and other values
that can exceed the range of a Python int. It may be necessary to
configure and compile Python with certain compiler flags to enable
this mode. For example, it is enabled by default with recent versions
of Irix, but with Solaris 2.6 and 2.7 you need to do something like:

\begin{verbatim}
CFLAGS="-D_LARGEFILE_SOURCE -D_FILE_OFFSET_BITS=64" OPT="-g -O2 $CFLAGS" \
        configure
\end{verbatim} % $ <-- bow to font-lock


\subsection{\module{posix} Module Contents \label{posix-contents}}

Module \module{posix} defines the following data items:

\begin{datadesc}{environ}
A dictionary or dictionary look-alike representing the string
environment at the time the interpreter was started. For example,
\code{posix.environ['HOME']} is the pathname of your home directory,
equivalent to \code{getenv("HOME")} in \C{}.

Modifying this dictionary does not affect the string environment
passed on by \function{execv()}, \function{popen()} or
\function{system()}; if you need to change the environment, pass
\code{environ} to \function{execve()} or add variable assignments and
export statements to the command string for \function{system()} or
\function{popen()}.

\emph{However:} If you are using this module via the \module{os}
module (as you should -- see the introduction above), \code{environ}
is a a mapping object that behaves almost like a dictionary but
invokes \function{putenv()} automatically whenever an item is changed.
\end{datadesc}

\begin{excdesc}{error}
This exception is raised when a \POSIX{} function returns a
\POSIX{}-related error (e.g., not for illegal argument types).  The
accompanying value is a pair containing the numeric error code from
\cdata{errno} and the corresponding string, as would be printed by the
\C{} function \cfunction{perror()}.  See the module
\module{errno}\refbimodindex{errno}, which contains names for the
error codes defined by the underlying operating system.

When exceptions are classes, this exception carries two attributes,
\member{errno} and \member{strerror}.  The first holds the value of
the \C{} \cdata{errno} variable, and the latter holds the
corresponding error message from \cfunction{strerror()}.  For
exceptions that involve a file system path (e.g. \code{chdir} or
\code{unlink}), the exception instance will contain a third attribute
\member{filename} which is the file name passed to the
function.

When exceptions are strings, the string for the exception is
\code{'OSError'}.
\end{excdesc}

It defines the following functions and constants when the operating
system provides them directly or provides the means to emulate them:

\begin{funcdesc}{access}{path, mode}
Check read/write/execute permissions for this process or extance of file
\var{path}.  Return \code{1} if access is granted, \code{0} if not.
See the \UNIX{} manual for the semantics.
\end{funcdesc}

\begin{funcdesc}{chdir}{path}
Change the current working directory to \var{path}.
\end{funcdesc}

\begin{funcdesc}{chmod}{path, mode}
Change the mode of \var{path} to the numeric \var{mode}.
\end{funcdesc}

\begin{funcdesc}{chown}{path, uid, gid}
Change the owner and group id of \var{path} to the numeric \var{uid}
and \var{gid}.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{close}{fd}
Close file descriptor \var{fd}.

Note: this function is intended for low-level I/O and must be applied
to a file descriptor as returned by \function{open()} or
\function{pipe()}.  To close a ``file object'' returned by the
built-in function \function{open()} or by \function{popen()} or
\function{fdopen()}, use its \method{close()} method.
\end{funcdesc}

\begin{funcdesc}{dup}{fd}
Return a duplicate of file descriptor \var{fd}.
\end{funcdesc}

\begin{funcdesc}{dup2}{fd, fd2}
Duplicate file descriptor \var{fd} to \var{fd2}, closing the latter
first if necessary.
\end{funcdesc}

\begin{funcdesc}{execv}{path, args}
Execute the executable \var{path} with argument list \var{args},
replacing the current process (i.e., the Python interpreter).
The argument list may be a tuple or list of strings.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{execve}{path, args, env}
Execute the executable \var{path} with argument list \var{args},
and environment \var{env},
replacing the current process (i.e., the Python interpreter).
The argument list may be a tuple or list of strings.
The environment must be a dictionary mapping strings to strings.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{_exit}{n}
Exit to the system with status \var{n}, without calling cleanup
handlers, flushing stdio buffers, etc.
(Not on MS-DOS.)

Note: the standard way to exit is \code{sys.exit(\var{n})}.
\function{_exit()} should normally only be used in the child process
after a \function{fork()}.
\end{funcdesc}

\begin{funcdesc}{fdopen}{fd\optional{, mode\optional{, bufsize}}}
Return an open file object connected to the file descriptor \var{fd}.
The \var{mode} and \var{bufsize} arguments have the same meaning as
the corresponding arguments to the built-in \function{open()} function.
\end{funcdesc}

\begin{funcdesc}{fork}{}
Fork a child process.  Return \code{0} in the child, the child's
process id in the parent.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{fstat}{fd}
Return status for file descriptor \var{fd}, like \function{stat()}.
\end{funcdesc}

\begin{funcdesc}{fstatvfs}{fd}
Return information about the filesystem containing the file associated
with file descriptor \var{fd}, like \function{statvfs()}.
\end{funcdesc}

\begin{funcdesc}{ftruncate}{fd, length}
Truncate the file corresponding to file descriptor \var{fd}, 
so that it is at most \var{length} bytes in size.
\end{funcdesc}

\begin{funcdesc}{getcwd}{}
Return a string representing the current working directory.
\end{funcdesc}

\begin{funcdesc}{getegid}{}
Return the current process' effective group id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{geteuid}{}
Return the current process' effective user id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{getgid}{}
Return the current process' group id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{getpgrp}{}
\index{process!group}
Return the current process group id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{getpid}{}
\index{process!id}
Return the current process id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{getppid}{}
\index{process!id of parent}
Return the parent's process id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{getuid}{}
\index{user id}
Return the current process' user id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{kill}{pid, sig}
\index{process!killing}
\index{process!signalling}
Kill the process \var{pid} with signal \var{sig}.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{link}{src, dst}
Create a hard link pointing to \var{src} named \var{dst}.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{listdir}{path}
Return a list containing the names of the entries in the directory.
The list is in arbitrary order.  It does not include the special
entries \code{'.'} and \code{'..'} even if they are present in the
directory.
\end{funcdesc}

\begin{funcdesc}{lseek}{fd, pos, how}
Set the current position of file descriptor \var{fd} to position
\var{pos}, modified by \var{how}: \code{0} to set the position
relative to the beginning of the file; \code{1} to set it relative to
the current position; \code{2} to set it relative to the end of the
file.
\end{funcdesc}

\begin{funcdesc}{lstat}{path}
Like \function{stat()}, but do not follow symbolic links.  (On systems
without symbolic links, this is identical to \function{stat()}.)
\end{funcdesc}

\begin{funcdesc}{mkfifo}{path\optional{, mode}}
Create a FIFO (a \POSIX{} named pipe) named \var{path} with numeric mode
\var{mode}.  The default \var{mode} is \code{0666} (octal).  The current
umask value is first masked out from the mode.
(Not on MS-DOS.)

FIFOs are pipes that can be accessed like regular files.  FIFOs exist
until they are deleted (for example with \function{os.unlink()}).
Generally, FIFOs are used as rendezvous between ``client'' and
``server'' type processes: the server opens the FIFO for reading, and
the client opens it for writing.  Note that \function{mkfifo()}
doesn't open the FIFO --- it just creates the rendezvous point.
\end{funcdesc}

\begin{funcdesc}{mkdir}{path\optional{, mode}}
Create a directory named \var{path} with numeric mode \var{mode}.
The default \var{mode} is \code{0777} (octal).  On some systems,
\var{mode} is ignored.  Where it is used, the current umask value is
first masked out.
\end{funcdesc}

\begin{funcdesc}{nice}{increment}
Add \var{increment} to the process' ``niceness''.  Return the new
niceness.  (Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{open}{file, flags\optional{, mode}}
Open the file \var{file} and set various flags according to
\var{flags} and possibly its mode according to \var{mode}.
The default \var{mode} is \code{0777} (octal), and the current umask
value is first masked out.  Return the file descriptor for the newly
opened file.

For a description of the flag and mode values, see the \UNIX{} or \C{}
run-time documentation; flag constants (like \constant{O_RDONLY} and
\constant{O_WRONLY}) are defined in this module too (see below).

Note: this function is intended for low-level I/O.  For normal usage,
use the built-in function \function{open()}, which returns a ``file
object'' with \method{read()} and \method{write()} methods (and many
more).
\end{funcdesc}

\begin{funcdesc}{pipe}{}
Create a pipe.  Return a pair of file descriptors \code{(\var{r},
\var{w})} usable for reading and writing, respectively.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{plock}{op}
Lock program segments into memory.  The value of \var{op}
(defined in \code{<sys/lock.h>}) determines which segments are locked.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{popen}{command\optional{, mode\optional{, bufsize}}}
Open a pipe to or from \var{command}.  The return value is an open
file object connected to the pipe, which can be read or written
depending on whether \var{mode} is \code{'r'} (default) or \code{'w'}.
The \var{bufsize} argument has the same meaning as the corresponding
argument to the built-in \function{open()} function.  The exit status of
the command (encoded in the format specified for \function{wait()}) is
available as the return value of the \method{close()} method of the file
object, except that when the exit status is zero (termination without
errors), \code{None} is returned.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{putenv}{varname, value}
\index{environment variables!setting}
Set the environment variable named \var{varname} to the string
\var{value}.  Such changes to the environment affect subprocesses
started with \function{os.system()}, \function{os.popen()} or
\function{os.fork()} and \function{os.execv()}.  (Not on all systems.)

When \function{putenv()} is
supported, assignments to items in \code{os.environ} are automatically
translated into corresponding calls to \function{putenv()}; however,
calls to \function{putenv()} don't update \code{os.environ}, so it is
actually preferable to assign to items of \code{os.environ}.  
\end{funcdesc}

\begin{funcdesc}{strerror}{code}
Return the error message corresponding to the error code in \var{code}.
\end{funcdesc}

\begin{funcdesc}{ttyname}{fd}
Return a string which specifies the terminal device associated with
file-descriptor \var{fd}.  If \var{fd} is not associated with a terminal
device, an exception is raised.
\end{funcdesc}

\begin{funcdesc}{read}{fd, n}
Read at most \var{n} bytes from file descriptor \var{fd}.
Return a string containing the bytes read.

Note: this function is intended for low-level I/O and must be applied
to a file descriptor as returned by \function{open()} or
\function{pipe()}.  To read a ``file object'' returned by the
built-in function \function{open()} or by \function{popen()} or
\function{fdopen()}, or \code{sys.stdin}, use its
\method{read()} or \method{readline()} methods.
\end{funcdesc}

\begin{funcdesc}{readlink}{path}
Return a string representing the path to which the symbolic link
points.  (On systems without symbolic links, this always raises
\exception{error}.)
\end{funcdesc}

\begin{funcdesc}{remove}{path}
Remove the file \var{path}.  See \function{rmdir()} below to remove a
directory.  This is identical to the \function{unlink()} function
documented below.
\end{funcdesc}

\begin{funcdesc}{rename}{src, dst}
Rename the file or directory \var{src} to \var{dst}.
\end{funcdesc}

\begin{funcdesc}{rmdir}{path}
Remove the directory \var{path}.
\end{funcdesc}

\begin{funcdesc}{setgid}{gid}
Set the current process' group id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{setpgrp}{}
Calls the system call \cfunction{setpgrp()} or \cfunction{setpgrp(0,
0)} depending on which version is implemented (if any).  See the
\UNIX{} manual for the semantics.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{setpgid}{pid, pgrp}
Calls the system call \cfunction{setpgid()}.  See the \UNIX{} manual
for the semantics.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{setsid}{}
Calls the system call \cfunction{setsid()}.  See the \UNIX{} manual
for the semantics.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{setuid}{uid}
Set the current process' user id.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{stat}{path}
Perform a \cfunction{stat()} system call on the given path.  The
return value is a tuple of at least 10 integers giving the most
important (and portable) members of the \emph{stat} structure, in the
order
\code{st_mode},
\code{st_ino},
\code{st_dev},
\code{st_nlink},
\code{st_uid},
\code{st_gid},
\code{st_size},
\code{st_atime},
\code{st_mtime},
\code{st_ctime}.
More items may be added at the end by some implementations.
(On MS-DOS, some items are filled with dummy values.)

Note: The standard module \module{stat}\refstmodindex{stat} defines
functions and constants that are useful for extracting information
from a \ctype{stat} structure.
\end{funcdesc}

\begin{funcdesc}{statvfs}{path}
Perform a \cfunction{statvfs()} system call on the given path.  The
return value is a tuple of 11 integers giving the most common
members of the \ctype{statvfs} structure, in the order
\code{f_bsize},
\code{f_frsize},
\code{f_blocks},
\code{f_bfree},
\code{f_bavail},
\code{f_files},
\code{f_ffree},
\code{f_favail},
\code{f_fsid},
\code{f_flag},
\code{f_namemax}.

Note: The standard module \module{statvfs}\refstmodindex{statvfs}
defines constants that are useful for extracting information
from a \ctype{statvfs} structure.
\end{funcdesc}

\begin{funcdesc}{symlink}{src, dst}
Create a symbolic link pointing to \var{src} named \var{dst}.  (On
systems without symbolic links, this always raises \exception{error}.)
\end{funcdesc}

\begin{funcdesc}{system}{command}
Execute the command (a string) in a subshell.  This is implemented by
calling the Standard \C{} function \cfunction{system()}, and has the
same limitations.  Changes to \code{posix.environ}, \code{sys.stdin}
etc.\ are not reflected in the environment of the executed command.
The return value is the exit status of the process encoded in the
format specified for \function{wait()}.
\end{funcdesc}

\begin{funcdesc}{tcgetpgrp}{fd}
Return the process group associated with the terminal given by
\var{fd} (an open file descriptor as returned by \function{open()}).
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{tcsetpgrp}{fd, pg}
Set the process group associated with the terminal given by
\var{fd} (an open file descriptor as returned by \function{open()})
to \var{pg}.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{times}{}
Return a 5-tuple of floating point numbers indicating accumulated (CPU
or other)
times, in seconds.  The items are: user time, system time, children's
user time, children's system time, and elapsed real time since a fixed
point in the past, in that order.  See the \UNIX{}
manual page \manpage{times}{2}.  (Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{umask}{mask}
Set the current numeric umask and returns the previous umask.
(Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{uname}{}
Return a 5-tuple containing information identifying the current
operating system.  The tuple contains 5 strings:
\code{(\var{sysname}, \var{nodename}, \var{release}, \var{version},
\var{machine})}.  Some systems truncate the nodename to 8
characters or to the leading component; a better way to get the
hostname is \function{socket.gethostname()}%
\withsubitem{(in module socket)}{\ttindex{gethostname()}}
or even
\code{socket.gethostbyaddr(socket.gethostname())}%
\withsubitem{(in module socket)}{\ttindex{gethostbyaddr()}}.
(Not on MS-DOS, nor on older \UNIX{} systems.)
\end{funcdesc}

\begin{funcdesc}{unlink}{path}
Remove the file \var{path}.  This is the same function as \code{remove};
the \code{unlink} name is its traditional \UNIX{} name.
\end{funcdesc}

\begin{funcdesc}{utime}{path, (atime, mtime)}
Set the access and modified time of the file to the given values.
(The second argument is a tuple of two items.)
\end{funcdesc}

\begin{funcdesc}{wait}{}
Wait for completion of a child process, and return a tuple containing
its pid and exit status indication: a 16-bit number, whose low byte is
the signal number that killed the process, and whose high byte is the
exit status (if the signal number is zero); the high bit of the low
byte is set if a core file was produced.  (Not on MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{waitpid}{pid, options}
Wait for completion of a child process given by proces id, and return
a tuple containing its pid and exit status indication (encoded as for
\function{wait()}).  The semantics of the call are affected by the
value of the integer \var{options}, which should be \code{0} for
normal operation.  (If the system does not support
\function{waitpid()}, this always raises \exception{error}.  Not on
MS-DOS.)
\end{funcdesc}

\begin{funcdesc}{write}{fd, str}
Write the string \var{str} to file descriptor \var{fd}.
Return the number of bytes actually written.

Note: this function is intended for low-level I/O and must be applied
to a file descriptor as returned by \function{open()} or
\function{pipe()}.  To write a ``file object'' returned by the
built-in function \function{open()} or by \function{popen()} or
\function{fdopen()}, or \code{sys.stdout} or \code{sys.stderr}, use
its \method{write()} method.
\end{funcdesc}

\begin{datadesc}{WNOHANG}
The option for \function{waitpid()} to avoid hanging if no child
process status is available immediately.
\end{datadesc}


\begin{datadesc}{O_RDONLY}
\dataline{O_WRONLY}
\dataline{O_RDWR}
\dataline{O_NDELAY}
\dataline{O_NONBLOCK}
\dataline{O_APPEND}
\dataline{O_DSYNC}
\dataline{O_RSYNC}
\dataline{O_SYNC}
\dataline{O_NOCTTY}
\dataline{O_CREAT}
\dataline{O_EXCL}
\dataline{O_TRUNC}
Options for the \code{flag} argument to the \function{open()} function.
These can be bit-wise OR'd together.
\end{datadesc}
